(footprint "TestPoint_Pad_D0.5mm" (version 20211232) (generator pcbnew)
  (layer "F.Cu")
  (tedit 6200B887)
  (descr "SMD pad as test Point, diameter 2.0mm")
  (tags "test point SMD pad")
  (attr exclude_from_pos_files exclude_from_bom)
  (fp_text reference "REF**" (at 0 -1.016) (layer "F.SilkS"))
  (fp_text value "TestPoint_Pad_D0.5mm" (at 0 1.016) (layer "F.Fab"))
  (fp_text user "${REFERENCE}" (at 0 -1.016) (layer "F.Fab"))
  (pad "1" smd circle (at 0 0) (size 0.5 0.5) (property pad_prop_testpoint) (layers "F.Cu" "F.Mask"))
)
