(footprint "HDR-TH_3P-P2.54-V-M"
	(version 20240108)
	(generator "pcbnew")
	(generator_version "8.0")
	(layer "F.Cu")
	(property "Reference" "REF**"
		(at 0 0 0)
		(unlocked yes)
		(layer "F.SilkS")
	)
	(property "Value" ""
		(at 0 0 0)
		(unlocked yes)
		(layer "F.Fab")
	)
	(property "Footprint" ""
		(at 0 0 0)
		(unlocked yes)
		(layer "F.Fab")
		(hide yes)
	)
	(property "Datasheet" ""
		(at 0 0 0)
		(unlocked yes)
		(layer "F.Fab")
		(hide yes)
	)
	(property "Description" ""
		(at 0 0 0)
		(unlocked yes)
		(layer "F.Fab")
		(hide yes)
	)
	(property "JLC_3DModel_Q" "bb473b6d38ff42a99216a4fcdbdcc4cb"
		(at 0 0 0)
		(unlocked yes)
		(layer "Cmts.User")
		(hide yes)
	)
	(property "JLC_3D_Size" "7.62 2.54"
		(at 0 0 0)
		(unlocked yes)
		(layer "Cmts.User")
		(hide yes)
	)
	(pad "1" thru_hole rect
		(at -2.54 0)
		(size 1.7 1.7)
		(drill 1.1)
		(layers "*.Cu" "*.Mask")
		(remove_unused_layers no)
	)
	(pad "2" thru_hole circle
		(at 0 0)
		(size 1.7 1.7)
		(drill 1.1)
		(layers "*.Cu" "*.Mask")
		(remove_unused_layers no)
		(thermal_bridge_angle 90)
	)
	(pad "3" thru_hole circle
		(at 2.54 0)
		(size 1.7 1.7)
		(drill 1.1)
		(layers "*.Cu" "*.Mask")
		(remove_unused_layers no)
		(thermal_bridge_angle 90)
	)
	(model "${KIPRJMOD}/EASYEDA_MODELS/HDR-TH_3P-P2.54-M-LI-1X3P.step"
		(offset
			(xyz 0 0 -3)
		)
		(scale
			(xyz 1 1 1)
		)
		(rotate
			(xyz 0 0 -0)
		)
	)
)